\ANG{
$a\,\approx\,26$ (auf Ganze gerundet); $\quad b=5{,}5\,\pm\,0{,}5$.\\[4mm]
Berechne $\D x=\frac{a}{b}$ in der Form \GF{Mittelwert $\pm$ Fehler}.

}
\LSG{
 $\D x_{\mathrm{min}}=\frac{25{,}5}{6}=4{,}25$,\quad
 $\D x_{\mathrm{max}}=\frac{26{,}5}{5}=5{,}3$,\quad
 $x=4{,}775\pm 0{,}525$ 
}