\ANG{
\begin{minipage}[t]{8cm}
Eine Kugel vom Durchmesser $d=1,0\, \rm m$ rollt auf ein Loch vom
Durchmesser $l=70\, \rm cm$ zu. Wie tief sackt die Kugel in das Loch ein? Runde das
Ergebnis auf ganze  cm.
\end{minipage}
\hfill
\begin{minipage}[t]{6cm}
\makebox[0cm]{}\\[-12mm]
\beginpicture

\setcoordinatesystem units <1mm,1mm> point at 0 0
\setplotarea x from 0 to 59, y from 0 to 40
\unitlength1mm

\setlinear
\plot 0 10 30 10 30 0 /
\plot 45 0 45 10 59 10 /

\circulararc 360 degrees from 15 10 center at 15 20

\betweenarrows {l} from 30 5 to 45 5
\betweenarrows {d} from 5 20 to 25 20

\endpicture
\end{minipage}
}
\LSG{ $14\, \rm cm$ }