\ANG{
Wer im Glashaus sitzt\ldots \\
Von einer Pyramide aus Glas (Dichte für Glas $\varrho=2,\!7\,\frac{\mathrm{g}}{\mathrm{cm}^3}$) 
mit quadratischer Grundfläche sind gegeben:
%\vspace{-4ex}
\begin{center}
\EPSBASIS{04jlflvol009_Pyramide}{5cm}{}
\end{center}
%\vspace{-6ex}
\begin{enumerate}
	\item[a)] $a =$ 15 cm, $h_\mathrm{a} =$ 18 cm
	\item[b)] $h_\mathrm{k} =$ 7,8 cm, $h_\mathrm{a} =$ 9,4 cm
	\item[c)] $V =$ 260 $\ell$, $h_\mathrm{k} =$ 7,2 dm
\end{enumerate}
Berechne die jeweils fehlenden Größen ($a$, $h_\mathrm{a}$, $h_\mathrm{k}$, $s$, $V$, $M$, $O$ und die Masse $m$)!
}

\LSG{
\begin{enumerate}
	\item[a)] $h_\mathrm{k} =$ 16,36~cm; $s =$ 19,5~cm; $V =$ 1227,23~cm$^3$; $M =$ 540~cm$^2$; $O =$ 765~cm$^2$; $m =$ 3313,52~g
	\item[b)] $a =$ 10,49~cm; $s =$ 10,76~cm; $M =$ 197,248~cm$^2$; $O =$ 307,328~cm$^2$; $V =$ 286,208~cm$^3$, $m =$ 772,7616~g
	\item[c)] $a =$ 10,41~cm; $h_\mathrm{a} =$ 8,88~cm; $s =$ 10,3~cm; $M =$ 184,932~cm$^2$; $O =$ 293,266~cm$^2$; $m =$ 702~g
\end{enumerate}
}
