%
% 
\ANG{
{\bf S"aule}

F"ur eine quadratische S"aule mit der H"ohe $5\,\mathrm{cm}$ gilt:
\begin{enumerate}
\item Die Grundfl"ache ist um $14\,\mathrm{cm^{2}}$ [um 
$24\,\mathrm{cm^{2}}$] gr"o"ser als die Seitenfl"ache.
\item Die gesamte Oberfl"ache betr"agt $48\,\mathrm{cm^{2}}\ 
[288\,\mathrm{cm^{2}};\ 112\,\mathrm{cm^{2}}$].
\end{enumerate}
Berechne die Seitenl"ange der quadratischen Grundfl"ache.
}
\LSG{
\begin{enumerate}
\item $7\,\mathrm{cm}\ [8\,\mathrm{cm}]$
\item $2\,\mathrm{cm}\ [8\,\mathrm{cm} / 4\,\mathrm{cm}]$
\end{enumerate}
}
