%
% 
\ANG{
{\bf Schwierige Pyramide}

Von einer quadratischen Pyramide sind gegeben: 	\\
$M = 1680\,\mathrm{cm^{2}}$ und $s = 37\,\mathrm{cm}$. Berechne das Volumen.
}
\LSG{Die Pyramide hat ein Volumen von 6316,8 Kubikzentimeter

}
